<template>
  <path
    d="M13 18.0002H11V16.0002H13V18.0002ZM8.99998 15.0002V19.0002C8.99998 19.5502 9.44998 20.0002 9.99998 20.0002H14C14.55 20.0002 15 19.5502 15 19.0002V15.0002C15 14.4502 14.55 14.0002 14 14.0002H9.99998C9.44998 14.0002 8.99998 14.4502 8.99998 15.0002ZM19 9.30022V5.00021C19 4.45021 18.55 4.00021 18 4.00021H17C16.45 4.00021 16 4.45021 16 5.00021V6.60021L12.67 3.60021C12.29 3.26021 11.71 3.26021 11.33 3.60021L2.96998 11.1302C2.62998 11.4302 2.83998 12.0002 3.29998 12.0002H4.60998C4.85998 12.0002 5.09998 11.9102 5.27998 11.7402L12 5.69022L18.71 11.7402C18.9 11.9102 19.14 12.0002 19.38 12.0002H20.69C21.15 12.0002 21.37 11.4302 21.02 11.1302L19 9.30022Z"
  />
</template>
