<template>
  <path
    d="M8 20.0002C8 21.1002 7.1 22.0002 6 22.0002C4.9 22.0002 4 21.1002 4 20.0002C4 18.9002 4.9 18.0002 6 18.0002C7.1 18.0002 8 18.9002 8 20.0002ZM14.3 4.10024C13.03 3.40024 11.56 3.00024 10 3.00024C8.77 3.00024 7.61 3.26024 6.54 3.71024L10.91 8.08024L14.3 4.10024ZM20.49 21.9002C20.88 21.5102 20.88 20.8802 20.49 20.4902L10.67 10.6702L3.51 3.51024C3.12 3.12024 2.49 3.12024 2.1 3.51024C1.71 3.90024 1.71 4.53024 2.1 4.92024L9.35999 12.1802L6.7 15.3002C6.14999 15.9502 6.61 16.9502 7.46 16.9502H14.12L15.29 18.1202C14.41 18.4502 13.82 19.3702 14.03 20.4002C14.18 21.1602 14.81 21.7902 15.57 21.9402C16.6 22.1502 17.52 21.5602 17.85 20.6802L19.05 21.8802C19.46 22.2902 20.09 22.2902 20.49 21.9002ZM17 6.27024C17.58 5.59024 17.97 5.00024 18.65 5.00024C19.33 5.00024 19.87 5.52024 19.98 6.21024C20.08 6.66024 20.48 7.00024 20.96 7.00024C21.51 7.00024 21.96 6.55024 21.96 6.00024C21.96 5.94024 21.96 5.89024 21.95 5.84024V5.83024C21.65 4.22024 20.3 3.00024 18.65 3.00024C16.99 3.00024 16.11 4.27024 15.47 5.03024L11.97 9.14024L17 14.1702V6.27024Z"
  />
</template>
