<template>
  <path
    d="M3.16002 3.16024C2.77002 2.77024 2.14002 2.77024 1.75002 3.16024C1.36002 3.55024 1.36002 4.18024 1.75002 4.57024L6.35002 9.17024L6.14002 9.40024H3.60002C2.72002 9.40024 2.00002 10.1202 2.00002 11.0002V20.4002C2.00002 21.2802 2.72002 22.0002 3.60002 22.0002H16.4C17.15 22.0002 17.78 21.4802 17.95 20.7802L19.42 22.2502C19.81 22.6402 20.44 22.6402 20.83 22.2502C21.22 21.8602 21.22 21.2302 20.83 20.8402L3.16002 3.16024ZM10 20.0002C7.79002 20.0002 6.00002 18.2102 6.00002 16.0002C6.00002 14.0502 7.40002 12.4302 9.25002 12.0802L10.82 13.6502C10.56 13.5602 10.29 13.5002 10 13.5002C8.62002 13.5002 7.50002 14.6202 7.50002 16.0002C7.50002 17.3802 8.62002 18.5002 10 18.5002C11.38 18.5002 12.5 17.3802 12.5 16.0002C12.5 15.7102 12.44 15.4402 12.35 15.1802L13.92 16.7502C13.57 18.6002 11.95 20.0002 10 20.0002ZM18 15.1702L10.83 8.00024H11.7C12.26 8.00024 12.8 8.24024 13.18 8.65024L13.87 9.40024H16.41C17.29 9.40024 18.01 10.1202 18.01 11.0002V15.1702H18ZM20.4 5.60024H21.15C21.53 5.60024 21.77 6.01024 21.59 6.34024L19 11.0002V7.00024H18.5C18.22 7.00024 18 6.78024 18 6.50024V2.50024C18 2.22024 18.22 2.00024 18.5 2.00024H21.23C21.59 2.00024 21.83 2.37024 21.69 2.70024L20.4 5.60024Z"
  />
</template>
