<template>
  <path
    d="M1.94 11.7902C1.34 12.3602 1 13.1402 1 13.9702V20.0002C1 21.6602 2.34 23.0002 4 23.0002H17.68C18.33 23.0002 18.93 22.5302 19 21.8802C19.08 21.1302 18.49 20.5002 17.76 20.5002H12.5C12.22 20.5002 12 20.2802 12 20.0002C12 19.7202 12.22 19.5002 12.5 19.5002H19.68C20.33 19.5002 20.93 19.0302 21 18.3802C21.08 17.6302 20.49 17.0002 19.76 17.0002H12.5C12.22 17.0002 12 16.7802 12 16.5002C12 16.2202 12.22 16.0002 12.5 16.0002H20.68C21.33 16.0002 21.93 15.5302 22 14.8802C22.08 14.1302 21.49 13.5002 20.76 13.5002H12.5C12.22 13.5002 12 13.2802 12 13.0002C12 12.7202 12.22 12.5002 12.5 12.5002H18.68C19.33 12.5002 19.93 12.0302 20 11.3802C20.08 10.6302 19.49 10.0002 18.76 10.0002H8.86L10.35 7.39024C10.44 7.23024 10.49 7.06024 10.49 6.86024C10.49 6.60024 10.4 6.36024 10.23 6.16024L9.81 5.71024C9.43 5.32024 8.8 5.30024 8.4 5.68024L1.94 11.7902ZM16.99 8.07024C16.99 8.59024 16.57 9.00024 16.06 9.00024C15.54 9.00024 15.13 8.58024 15.13 8.07024C15.16 7.40024 14.91 6.74024 14.42 6.21024L14.35 6.15024C13.45 5.26024 12.97 4.12024 13.01 2.93024C13 2.42024 13.42 2.00024 13.93 2.00024C14.44 2.00024 14.86 2.42024 14.86 2.93024C14.83 3.60024 15.08 4.26024 15.57 4.79024L15.64 4.86024C16.55 5.74024 17.03 6.88024 16.99 8.07024ZM21 8.07024C21 8.58024 20.58 9.00024 20.06 9.00024C19.54 9.00024 19.13 8.58024 19.13 8.07024C19.16 7.40024 18.91 6.74024 18.42 6.21024L18.35 6.15024C17.45 5.26024 16.97 4.12024 17.01 2.93024C17.01 2.42024 17.43 2.00024 17.94 2.00024C18.45 2.00024 18.87 2.42024 18.87 2.93024C18.84 3.60024 19.09 4.26024 19.58 4.79024L19.65 4.86024C20.55 5.74024 21.03 6.88024 21 8.07024Z"
  />
</template>
