<template>
  <path
    d="M13 10.1702L10.5 7.67024V2.25024C10.5 1.56024 11.06 1.00024 11.75 1.00024C12.44 1.00024 13 1.56024 13 2.25024V10.1702ZM20 5.32024C20 4.67024 19.53 4.07024 18.88 4.00024C18.13 3.92024 17.5 4.51024 17.5 5.24024V10.4902C17.5 10.7702 17.28 10.9902 17 10.9902C16.72 10.9902 16.5 10.7702 16.5 10.4902V3.31024C16.5 2.66024 16.03 2.06024 15.38 1.99024C14.63 1.93024 14 2.52024 14 3.25024V11.1702L20 17.1702V5.32024ZM9.5 4.25024C9.5 3.56024 8.94 3.00024 8.25 3.00024C7.58 3.00024 7.05 3.53024 7.01 4.18024L9.5 6.67024V4.25024ZM17 22.0002C17.62 22.0002 18.18 21.8102 18.65 21.4802L18.63 21.4602L19.07 21.9002C19.46 22.2902 20.09 22.2902 20.48 21.9002C20.87 21.5102 20.87 20.8802 20.48 20.4902L3.51 3.51024C3.12 3.12024 2.49 3.12024 2.1 3.51024C1.71 3.90024 1.71 4.53024 2.1 4.92024L7.02 9.84024L7 9.83024V14.1302L4.4 12.6502C4.23 12.5602 4.06 12.5102 3.86 12.5102C3.6 12.5102 3.36 12.6002 3.16 12.7702L2 13.8802L8.8 21.0602C9.37 21.6602 10.15 22.0002 10.98 22.0002H17Z"
  />
</template>
