<template>
  <path
    d="M2.1 3.51023C1.71 3.90023 1.71 4.53023 2.1 4.92023L9.29 12.1102C9.47 12.3102 9.47 12.6102 9.28 12.8102C9.18 12.9102 9.05 12.9602 8.93 12.9602C8.81 12.9602 8.67 12.9102 8.58 12.8102L6.87 11.1002C6.76 11.5002 6.61 11.8802 6.42 12.2202L7.82 13.6202C8.02 13.8202 8.02 14.1302 7.82 14.3302C7.72 14.4302 7.59 14.4802 7.47 14.4802C7.35 14.4802 7.21 14.4302 7.12 14.3302L5.85 13.0602C5.61 13.3502 5.35 13.6202 5.08 13.8602L6.36 15.1402C6.56 15.3402 6.56 15.6502 6.36 15.8502C6.26 15.9502 6.13 16.0002 6 16.0002C5.87 16.0002 5.74 15.9502 5.65 15.8502L4.27 14.4702C3.56 14.9402 2.84 15.2802 2.25 15.5102C1.49 15.8102 1 16.5502 1 17.3702V18.0002C1 19.1002 1.9 20.0002 3 20.0002H9.67C10.2 20.0002 10.71 19.7902 11.08 19.4102L13.82 16.6702L19.05 21.9002C19.44 22.2902 20.07 22.2902 20.46 21.9002C20.85 21.5102 20.85 20.8802 20.46 20.4902L3.51 3.51023C3.12 3.12023 2.49 3.12023 2.1 3.51023ZM18.51 15.6802L17.1 14.2702L21.58 9.79023C22.36 10.5702 22.36 11.8402 21.58 12.6202L18.51 15.6802ZM20.88 9.08023L16.4 13.5602L9.3 6.47023L12.39 3.40023C13.17 2.62023 14.43 2.63023 15.21 3.40023L20.88 9.08023Z"
  />
</template>
