<template>
  <path
    d="M21.6 18.2003L13 11.7503V10.8403C14.65 10.3503 15.8 8.67026 15.43 6.79026C15.17 5.48026 14.13 4.39026 12.82 4.09026C11.06 3.69026 9.45002 4.62026 8.80002 6.07026C8.50002 6.74026 8.98002 7.50026 9.71002 7.50026C10.1 7.50026 10.46 7.28026 10.61 6.93026C10.84 6.38026 11.37 6.00026 12 6.00026C12.83 6.00026 13.5 6.67026 13.5 7.50026C13.5 8.34026 12.81 9.02026 11.97 9.00026C11.43 8.99026 11 9.45026 11 9.99026V11.7503L2.40002 18.2003C1.63002 18.7803 2.04002 20.0003 3.00002 20.0003H12H21C21.96 20.0003 22.37 18.7803 21.6 18.2003ZM6.00002 18.0003L12 13.5003L18 18.0003H6.00002Z"
  />
</template>
