<template>
  <path
    d="M20.22 6.86024C18.22 6.26024 16.16 6.82024 14.83 8.15024L12 10.6602L10.48 12.0002H10.49L7.8 14.3902C6.99 15.2002 5.85 15.5402 4.68 15.3102C3.43 15.0602 2.4 14.0602 2.11 12.8202C1.59 10.5902 3.27 8.62024 5.4 8.62024C6.31 8.62024 7.16 8.97024 7.84 9.65024L8.31 10.0602C8.69 10.4002 9.26 10.4002 9.64 10.0602C10.09 9.66024 10.09 8.96024 9.64 8.56024L9.22 8.20024C8.2 7.18024 6.84 6.62024 5.4 6.62024C2.42 6.62024 0 9.04024 0 12.0002C0 14.9602 2.42 17.3802 5.4 17.3802C6.84 17.3802 8.2 16.8202 9.17 15.8502L12 13.3502L12.01 13.3602L13.52 12.0002H13.51L16.2 9.61024C17.01 8.80024 18.15 8.46024 19.32 8.69024C20.57 8.94024 21.6 9.94024 21.89 11.1802C22.41 13.4102 20.73 15.3802 18.6 15.3802C17.7 15.3802 16.84 15.0302 16.16 14.3502L15.68 13.9302C15.3 13.5902 14.73 13.5902 14.35 13.9302C13.9 14.3302 13.9 15.0302 14.35 15.4302L14.77 15.8002C15.79 16.8102 17.14 17.3702 18.59 17.3702C21.86 17.3702 24.45 14.4702 23.92 11.1202C23.62 9.13024 22.15 7.43024 20.22 6.86024Z"
  />
</template>
