<template>
  <path
    d="M21 11.0002H17.83L20.37 8.46024C20.76 8.07024 20.76 7.44024 20.37 7.05024C19.98 6.66024 19.34 6.66024 18.95 7.05024L15 11.0002H13V9.00024L16.95 5.05024C17.34 4.66024 17.34 4.02024 16.95 3.63024C16.56 3.24024 15.93 3.24024 15.54 3.63024L13 6.17024V3.00024C13 2.45024 12.55 2.00024 12 2.00024C11.45 2.00024 11 2.45024 11 3.00024V6.17024L8.46 3.63024C8.07 3.24024 7.44 3.24024 7.05 3.63024C6.66 4.02024 6.66 4.66024 7.05 5.05024L11 9.00024V11.0002H9L5.05 7.05024C4.66 6.66024 4.02 6.66024 3.63 7.05024C3.24 7.44024 3.24 8.07024 3.63 8.46024L6.17 11.0002H3C2.45 11.0002 2 11.4502 2 12.0002C2 12.5502 2.45 13.0002 3 13.0002H6.17L3.63 15.5402C3.24 15.9302 3.24 16.5602 3.63 16.9502C4.02 17.3402 4.66 17.3402 5.05 16.9502L9 13.0002H11V15.0002L7.05 18.9502C6.66 19.3402 6.66 19.9802 7.05 20.3702C7.44 20.7602 8.07 20.7602 8.46 20.3702L11 17.8302V21.0002C11 21.5502 11.45 22.0002 12 22.0002C12.55 22.0002 13 21.5502 13 21.0002V17.8302L15.54 20.3702C15.93 20.7602 16.56 20.7602 16.95 20.3702C17.34 19.9802 17.34 19.3402 16.95 18.9502L13 15.0002V13.0002H15L18.95 16.9502C19.34 17.3402 19.98 17.3402 20.37 16.9502C20.76 16.5602 20.76 15.9302 20.37 15.5402L17.83 13.0002H21C21.55 13.0002 22 12.5502 22 12.0002C22 11.4502 21.55 11.0002 21 11.0002Z"
  />
</template>
