<template>
  <path
    d="M18.92 5.01024C18.72 4.42024 18.16 4.00024 17.5 4.00024H6.5C5.84 4.00024 5.29 4.42024 5.08 5.01024L3.11 10.6802C3.04 10.8902 3 11.1102 3 11.3402V18.5002C3 19.3302 3.67 20.0002 4.5 20.0002C5.33 20.0002 6 19.3302 6 18.5002V18.0002H18V18.5002C18 19.3202 18.67 20.0002 19.5 20.0002C20.32 20.0002 21 19.3302 21 18.5002V11.3402C21 11.1202 20.96 10.8902 20.89 10.6802L18.92 5.01024ZM6.5 15.0002C5.67 15.0002 5 14.3302 5 13.5002C5 12.6702 5.67 12.0002 6.5 12.0002C7.33 12.0002 8 12.6702 8 13.5002C8 14.3302 7.33 15.0002 6.5 15.0002ZM17.5 15.0002C16.67 15.0002 16 14.3302 16 13.5002C16 12.6702 16.67 12.0002 17.5 12.0002C18.33 12.0002 19 12.6702 19 13.5002C19 14.3302 18.33 15.0002 17.5 15.0002ZM5 10.0002L6.27 6.18024C6.41 5.78024 6.79 5.50024 7.22 5.50024H16.78C17.21 5.50024 17.59 5.78024 17.73 6.18024L19 10.0002H5Z"
  />
</template>
