<template>
  <path
    d="M3.14 16.0902C2.54 15.9902 2 16.4802 2 17.0902C2 17.5802 2.36 17.9902 2.85 18.0702C4.93 18.4302 6.57 20.0702 6.93 22.1502C7.01 22.6402 7.42 23.0002 7.91 23.0002C8.52 23.0002 9 22.4602 8.91 21.8602C8.43 18.9102 6.1 16.5702 3.14 16.0902ZM2 20.0002V23.0002H5C5 21.3402 3.66 20.0002 2 20.0002ZM3.11 12.0602C2.52 12.0002 2 12.4602 2 13.0502C2 13.5502 2.37 13.9902 2.87 14.0402C7.14 14.4502 10.54 17.8502 10.95 22.1202C11 22.6202 11.43 23.0002 11.94 23.0002C12.53 23.0002 13 22.4902 12.94 21.9002C12.43 16.7002 8.31 12.5802 3.11 12.0602ZM17 1.01024L7 1.00024C5.9 1.00024 5 1.90024 5 3.00024V10.3702C5.69 10.5302 6.36 10.7402 7 11.0102V5.00024H17V18.0002H13.97C14.49 19.2502 14.81 20.5902 14.92 22.0002H17C18.1 22.0002 19 21.1002 19 20.0002V3.00024C19 1.90024 18.1 1.01024 17 1.01024Z"
  />
</template>
