<template>
  <path
    d="M19.23 15.2602L16.69 14.9702C16.08 14.9002 15.48 15.1102 15.05 15.5402L13.21 17.3802C10.38 15.9402 8.06004 13.6302 6.62004 10.7902L8.47004 8.94024C8.90004 8.51024 9.11004 7.91024 9.04004 7.30024L8.75004 4.78024C8.63004 3.77024 7.78004 3.01024 6.76004 3.01024H5.03004C3.90004 3.01024 2.96004 3.95024 3.03004 5.08024C3.56004 13.6202 10.39 20.4402 18.92 20.9702C20.05 21.0402 20.99 20.1002 20.99 18.9702V17.2402C21 16.2302 20.24 15.3802 19.23 15.2602ZM20 4.00024V3.50024C20 2.12024 18.88 1.00024 17.5 1.00024C16.12 1.00024 15 2.12024 15 3.50024V4.00024C14.45 4.00024 14 4.45024 14 5.00024V9.00024C14 9.55024 14.45 10.0002 15 10.0002H20C20.55 10.0002 21 9.55024 21 9.00024V5.00024C21 4.45024 20.55 4.00024 20 4.00024ZM19 4.00024H16V3.50024C16 2.67024 16.67 2.00024 17.5 2.00024C18.33 2.00024 19 2.67024 19 3.50024V4.00024Z"
  />
</template>
