<template>
  <path
    d="M12.88 5.05025C16.06 5.45025 18.55 7.94025 18.95 11.1203C19.01 11.6303 19.44 12.0003 19.94 12.0003C19.98 12.0003 20.02 12.0003 20.06 11.9903C20.61 11.9203 21 11.4203 20.93 10.8703C20.42 6.78025 17.21 3.57025 13.12 3.06025C12.57 3.00025 12.07 3.39025 12.01 3.94025C11.94 4.49025 12.33 4.99025 12.88 5.05025ZM13.26 7.16025C12.73 7.02025 12.18 7.34025 12.04 7.88025C11.9 8.42025 12.22 8.96025 12.76 9.10025C13.81 9.37025 14.63 10.1903 14.91 11.2503C15.03 11.7003 15.43 12.0003 15.88 12.0003C15.96 12.0003 16.05 11.9903 16.13 11.9703C16.66 11.8303 16.98 11.2803 16.85 10.7503C16.38 8.98025 15.01 7.61025 13.26 7.16025ZM19.23 15.2603L16.69 14.9703C16.08 14.9003 15.48 15.1103 15.05 15.5403L13.21 17.3803C10.38 15.9403 8.06004 13.6303 6.62004 10.7903L8.47004 8.94025C8.90004 8.51025 9.11004 7.91025 9.04004 7.30025L8.75004 4.78025C8.63004 3.77025 7.78004 3.01025 6.76004 3.01025H5.03004C3.90004 3.01025 2.96004 3.95025 3.03004 5.08025C3.56004 13.6203 10.39 20.4403 18.92 20.9703C20.05 21.0403 20.99 20.1003 20.99 18.9703V17.2403C21 16.2303 20.24 15.3803 19.23 15.2603Z"
  />
</template>
