<template>
  <path
    d="M15.9 5.0002C15.73 5.0002 15.58 5.0902 15.49 5.2302L15.42 5.3802L10.24 17.0302C10.08 17.3202 9.97999 17.6402 9.97999 17.9902C9.97999 19.1002 10.88 20.0002 11.99 20.0002C12.95 20.0002 13.76 19.3202 13.95 18.4102L13.96 18.3802L16.4 5.5002C16.4 5.2202 16.18 5.0002 15.9 5.0002ZM2.05999 10.0602C2.56999 10.5702 3.38999 10.6102 3.94999 10.1502C6.70999 7.8902 10.19 6.9702 13.53 7.3902L14.72 4.7102C10.37 3.9302 5.75999 5.0102 2.14999 7.9602C1.50999 8.4902 1.46999 9.4702 2.05999 10.0602ZM21.94 10.0602C22.53 9.4702 22.49 8.4902 21.84 7.9602C20.48 6.8502 18.98 6.0102 17.4 5.4302L16.87 8.2502C18 8.7202 19.06 9.3402 20.04 10.1402C20.62 10.6002 21.43 10.5702 21.94 10.0602ZM17.91 14.0902C18.51 13.4902 18.47 12.4602 17.77 11.9702C17.31 11.6402 16.83 11.3602 16.33 11.1102L15.78 14.0302C15.89 14.1002 16 14.1702 16.1 14.2502C16.67 14.6502 17.43 14.5702 17.91 14.0902ZM6.07999 14.0802C6.57999 14.5802 7.34999 14.6202 7.92999 14.2102C8.86999 13.5502 9.93999 13.1502 11.03 12.9902L12.31 10.1102C10.18 10.0502 8.02999 10.6502 6.21999 11.9502C5.52999 12.4602 5.47999 13.4802 6.07999 14.0802Z"
  />
</template>
