<template>
  <path
    d="M20 6.00024H12L10.59 4.59024C10.21 4.21024 9.7 4.00024 9.17 4.00024H4C2.9 4.00024 2 4.90024 2 6.00024V18.0002C2 19.1002 2.9 20.0002 4 20.0002H20C21.1 20.0002 22 19.1002 22 18.0002V8.00024C22 6.90024 21.1 6.00024 20 6.00024ZM16.94 16.4102L15 15.2802L13.06 16.4102C12.68 16.6302 12.22 16.2902 12.32 15.8602L12.83 13.6602L11.14 12.2002C10.81 11.9102 10.98 11.3602 11.42 11.3202L13.65 11.1302L14.53 9.07024C14.7 8.67024 15.28 8.67024 15.45 9.07024L16.33 11.1302L18.56 11.3202C19 11.3602 19.18 11.9102 18.84 12.2002L17.15 13.6602L17.66 15.8602C17.77 16.2902 17.31 16.6302 16.94 16.4102Z"
  />
</template>
