<template>
  <path
    d="M9.84 16.4702L11.75 14.5602L13.66 16.4702C13.95 16.7602 14.43 16.7602 14.72 16.4702C15.01 16.1802 15.01 15.7002 14.72 15.4102L12.81 13.5002L14.72 11.5902C15.01 11.3002 15.01 10.8202 14.72 10.5302C14.43 10.2402 13.95 10.2402 13.66 10.5302L11.75 12.4402L9.84 10.5302C9.55 10.2402 9.07 10.2402 8.78 10.5302C8.49 10.8202 8.49 11.3002 8.78 11.5902L10.69 13.5002L8.78 15.4102C8.49 15.7002 8.49 16.1802 8.78 16.4702C9.07 16.7602 9.55 16.7602 9.84 16.4702ZM19 3.00024H18V2.00024C18 1.45024 17.55 1.00024 17 1.00024C16.45 1.00024 16 1.45024 16 2.00024V3.00024H8V2.00024C8 1.45024 7.55 1.00024 7 1.00024C6.45 1.00024 6 1.45024 6 2.00024V3.00024H5C3.89 3.00024 3.01 3.90024 3.01 5.00024L3 19.0002C3 20.1002 3.89 21.0002 5 21.0002H19C20.1 21.0002 21 20.1002 21 19.0002V5.00024C21 3.90024 20.1 3.00024 19 3.00024ZM18 19.0002H6C5.45 19.0002 5 18.5502 5 18.0002V8.00024H19V18.0002C19 18.5502 18.55 19.0002 18 19.0002Z"
  />
</template>
