<template>
  <path
    d="M17 11.0002V13.0002H16.12L20.45 17.3302C21.43 15.7902 22 13.9602 22 12.0002C22 6.48024 17.52 2.00024 12 2.00024C10.04 2.00024 8.20998 2.57024 6.66998 3.55024L14.12 11.0002H17ZM21.17 20.8802L3.11998 2.83024C2.72998 2.44024 2.09998 2.44024 1.70998 2.83024C1.31998 3.22024 1.31998 3.85024 1.70998 4.24024L3.77998 6.31024C2.65998 7.93024 1.99998 9.89024 1.99998 12.0002C1.99998 17.5202 6.47998 22.0002 12 22.0002C14.11 22.0002 16.07 21.3402 17.68 20.2202L19.75 22.2902C20.14 22.6802 20.77 22.6802 21.16 22.2902C21.56 21.9002 21.56 21.2702 21.17 20.8802ZM6.99998 13.0002V11.0002H8.45998L10.46 13.0002H6.99998Z"
  />
</template>
