<template>
  <path
    d="M22 8.54024V6.00024C22 4.90024 21.1 4.00024 20 4.00024H4C2.9 4.00024 2.01 4.89024 2.01 6.00024V8.54024C2.01 9.23024 2.34 9.91024 2.95 10.2302C3.58 10.5802 4 11.2402 4 12.0002C4 12.7602 3.57 13.4302 2.94 13.7602C2.34 14.0902 2 14.7702 2 15.4602V18.0002C2 19.1002 2.9 20.0002 4 20.0002H20C21.1 20.0002 22 19.1002 22 18.0002V15.4602C22 14.7702 21.66 14.0902 21.06 13.7602C20.43 13.4202 20 12.7602 20 12.0002C20 11.2402 20.43 10.5802 21.06 10.2402C21.66 9.91024 22 9.23024 22 8.54024ZM13 17.5002H11V15.5002H13V17.5002ZM13 13.0002H11V11.0002H13V13.0002ZM13 8.50024H11V6.50024H13V8.50024Z"
  />
</template>
