<template>
  <path
    d="M15.98 10.2803L14.6 11.6603C14.4 11.8603 14.4 12.1703 14.6 12.3703L15.98 13.7503C16.26 14.0303 16.73 13.9003 16.83 13.5203C16.94 13.0203 17 12.5203 17 12.0003C17 11.4903 16.94 10.9903 16.82 10.5203C16.73 10.1403 16.26 10.0003 15.98 10.2803ZM20.1 7.78027C19.85 7.23027 19.12 7.11027 18.7 7.54027C18.44 7.80027 18.39 8.18027 18.53 8.52027C18.99 9.59027 19.25 10.7603 19.25 11.9903C19.25 13.2303 18.99 14.4103 18.52 15.4803C18.38 15.8003 18.43 16.1703 18.68 16.4203C19.09 16.8303 19.78 16.7103 20.03 16.1903C20.66 14.8903 21.01 13.4303 21.01 11.8903C21 10.4403 20.68 9.04027 20.1 7.78027ZM11.39 12.0003L14.98 8.42027C15.37 8.03027 15.37 7.40027 14.98 7.00027L10.69 2.71027C10.06 2.08027 8.97995 2.53027 8.97995 3.42027V9.60027L5.08995 5.70027C4.69995 5.31027 4.06995 5.31027 3.67995 5.70027C3.28995 6.09027 3.28995 6.72027 3.67995 7.11027L8.56995 12.0003L3.67995 16.8903C3.28995 17.2803 3.28995 17.9103 3.67995 18.3003C4.06995 18.6903 4.69995 18.6903 5.08995 18.3003L8.97995 14.4103V20.5903C8.97995 21.4803 10.06 21.9303 10.69 21.3003L14.99 17.0003C15.38 16.6103 15.38 15.9803 14.99 15.5803L11.39 12.0003ZM10.98 5.83027L12.86 7.71027L10.98 9.59027V5.83027ZM10.98 18.1703V14.4103L12.86 16.2903L10.98 18.1703Z"
  />
</template>
