<template>
  <path
    d="M7.59 5.41024C6.81 4.63024 6.81 3.36024 7.59 2.58024C8.37 1.80024 9.64 1.80024 10.42 2.58024C11.2 3.36024 11.2 4.63024 10.42 5.41024C9.63 6.20024 8.37 6.20024 7.59 5.41024ZM6 16.0002V8.00024C6 7.45024 5.55 7.00024 5 7.00024C4.45 7.00024 4 7.45024 4 8.00024V16.0002C4 18.7602 6.24 21.0002 9 21.0002H14C14.55 21.0002 15 20.5502 15 20.0002C15 19.4502 14.55 19.0002 14 19.0002H9C7.34 19.0002 6 17.6602 6 16.0002ZM19.28 19.3502L15.51 15.5802C15.14 15.2102 14.63 15.0002 14.1 15.0002H11.5V11.3202C12.59 12.2102 14.16 13.0202 15.7 13.3402C16.37 13.4802 17 12.9802 17 12.3002C17 11.7702 16.61 11.3402 16.08 11.2502C14.66 11.0102 13.2 10.2402 12.33 9.28024L10.93 7.73024C10.74 7.52024 10.5 7.35024 10.24 7.23024C9.95 7.09024 9.62 7.00024 9.28 7.00024H9.25C8.01 7.00024 7 8.01024 7 9.25024V15.0002C7 16.6602 8.34 18.0002 10 18.0002H15.07L17.85 20.7802C18.24 21.1702 18.89 21.1702 19.28 20.7802C19.68 20.3902 19.68 19.7502 19.28 19.3502Z"
  />
</template>
