<template>
  <path
    d="M21.81 12.7402L20.99 12.1102C20.99 12.0202 20.99 11.9802 20.99 11.8902L21.79 11.2602C21.95 11.1402 21.99 10.9202 21.89 10.7502L21.04 9.27024C20.97 9.14024 20.83 9.07024 20.69 9.07024C20.64 9.07024 20.59 9.08024 20.54 9.10024L19.59 9.48024C19.51 9.43024 19.48 9.41024 19.4 9.37024L19.25 8.36024C19.22 8.15024 19.05 8.00024 18.85 8.00024H17.14C16.94 8.00024 16.77 8.15024 16.74 8.34024L16.6 9.35024C16.57 9.37024 16.53 9.38024 16.5 9.40024C16.47 9.42024 16.44 9.44024 16.41 9.46024L15.46 9.08024C15.41 9.06024 15.36 9.05024 15.31 9.05024C15.17 9.05024 15.04 9.12024 14.96 9.25024L14.11 10.7302C14.01 10.9002 14.05 11.1202 14.21 11.2402L15.01 11.8702C15.01 11.9602 15.01 12.0002 15.01 12.1002L14.21 12.7302C14.05 12.8502 14.01 13.0702 14.11 13.2402L14.96 14.7202C15.03 14.8502 15.17 14.9202 15.31 14.9202C15.36 14.9202 15.41 14.9102 15.46 14.8902L16.41 14.5202C16.49 14.5702 16.53 14.5902 16.61 14.6302L16.76 15.6402C16.79 15.8402 16.96 15.9802 17.16 15.9802H18.87C19.07 15.9802 19.24 15.8302 19.27 15.6402L19.42 14.6302C19.45 14.6102 19.49 14.6002 19.52 14.5802C19.55 14.5602 19.58 14.5402 19.61 14.5202L20.56 14.9002C20.61 14.9202 20.66 14.9302 20.71 14.9302C20.85 14.9302 20.98 14.8602 21.06 14.7302L21.91 13.2502C22.01 13.0802 21.97 12.8602 21.81 12.7402ZM18 13.5002C17.17 13.5002 16.5 12.8302 16.5 12.0002C16.5 11.1702 17.17 10.5002 18 10.5002C18.83 10.5002 19.5 11.1702 19.5 12.0002C19.5 12.8302 18.83 13.5002 18 13.5002ZM17 17.0002H19V21.0002C19 22.1002 18.1 23.0002 17 23.0002H7C5.9 23.0002 5 22.1002 5 21.0002V3.00024C5 1.90024 5.9 1.00024 7 1.00024H17C18.1 1.00024 19 1.90024 19 3.00024V7.00024H17V6.00024H7V18.0002H17V17.0002Z"
  />
</template>
