<template>
  <path
    d="M15.85 3.85018L17.3 5.30018L15.12 7.46018C14.73 7.85018 14.73 8.49018 15.12 8.88018C15.51 9.27018 16.15 9.27018 16.54 8.88018L18.7 6.70018L20.15 8.15018C20.46 8.46018 21 8.24018 21 7.79018V3.50018C21 3.22018 20.78 3.00018 20.5 3.00018H16.21C15.76 3.00018 15.54 3.54018 15.85 3.85018ZM3.85 8.15018L5.3 6.70018L7.46 8.88018C7.85 9.27018 8.49 9.27018 8.88 8.88018C9.27 8.49018 9.27 7.85018 8.88 7.46018L6.7 5.30018L8.15 3.85018C8.46 3.54018 8.24 3.00018 7.79 3.00018H3.5C3.22 3.00018 3 3.22018 3 3.50018V7.79018C3 8.24018 3.54 8.46018 3.85 8.15018ZM8.15 20.1502L6.7 18.7002L8.88 16.5402C9.27 16.1502 9.27 15.5102 8.88 15.1202C8.49 14.7302 7.85 14.7302 7.46 15.1202L5.3 17.3002L3.85 15.8502C3.54 15.5402 3 15.7602 3 16.2102V20.5002C3 20.7802 3.22 21.0002 3.5 21.0002H7.79C8.24 21.0002 8.46 20.4602 8.15 20.1502ZM20.15 15.8502L18.7 17.3002L16.54 15.1202C16.15 14.7302 15.51 14.7302 15.12 15.1202C14.73 15.5102 14.73 16.1502 15.12 16.5402L17.3 18.7002L15.85 20.1502C15.54 20.4602 15.76 21.0002 16.21 21.0002H20.5C20.78 21.0002 21 20.7802 21 20.5002V16.2102C21 15.7602 20.46 15.5402 20.15 15.8502Z"
  />
</template>
