<template>
  <path
    d="M12 7.00018C6.48 7.00018 2 9.24018 2 12.0002C2 14.2402 4.94 16.1302 9 16.7702V18.7902C9 19.2402 9.54 19.4602 9.85 19.1402L12.64 16.3502C12.84 16.1502 12.84 15.8402 12.64 15.6402L9.85 12.8502C9.54 12.5402 9 12.7602 9 13.2102V14.7302C5.85 14.1702 4 12.8302 4 12.0002C4 10.9402 7.04 9.00018 12 9.00018C16.96 9.00018 20 10.9402 20 12.0002C20 12.6602 18.8 13.6802 16.68 14.3402C16.27 14.4702 16 14.8502 16 15.2802C16 15.9502 16.65 16.4402 17.28 16.2402C20.11 15.3602 22 13.7902 22 12.0002C22 9.24018 17.52 7.00018 12 7.00018Z"
  />
</template>
