<template>
  <path
    d="M22 15.5002H16.48V14.7302C16.48 14.3702 16.04 14.1902 15.79 14.4402L14.28 15.9602C14.12 16.1202 14.12 16.3702 14.28 16.5302L15.79 18.0502C16.05 18.3102 16.48 18.1302 16.48 17.7602V17.0002H22V15.5002ZM21.72 20.2102L20.21 18.6902C19.95 18.4302 19.52 18.6102 19.52 18.9802V19.7502H14V21.2502H19.52V22.0202C19.52 22.3802 19.96 22.5602 20.21 22.3102L21.72 20.7902C21.88 20.6302 21.88 20.3702 21.72 20.2102ZM9.5 5.50018C10.6 5.50018 11.5 4.60018 11.5 3.50018C11.5 2.40018 10.6 1.50018 9.5 1.50018C8.4 1.50018 7.5 2.40018 7.5 3.50018C7.5 4.60018 8.4 5.50018 9.5 5.50018ZM5.75 8.90018L3.23 21.8102C3.11 22.4302 3.58 23.0002 4.21 23.0002H4.3C4.77 23.0002 5.18 22.6702 5.28 22.2102L6.85 15.0002L9 17.0002V22.0002C9 22.5502 9.45 23.0002 10 23.0002C10.55 23.0002 11 22.5502 11 22.0002V16.2802C11 15.7502 10.79 15.2402 10.41 14.8702L8.95 13.4002L9.55 10.4002C10.62 11.7202 12.13 12.6302 13.86 12.9102C14.46 13.0102 15 12.5202 15 11.9102C15 11.4202 14.64 11.0102 14.16 10.9302C12.67 10.6802 11.41 9.78018 10.65 8.55018L9.7 6.95018C9.35 6.35018 8.7 6.00018 8 6.00018C7.75 6.00018 7.5 6.05018 7.25 6.15018L3.24 7.79018C2.49 8.10018 2 8.83018 2 9.64018V12.0002C2 12.5502 2.45 13.0002 3 13.0002C3.55 13.0002 4 12.5502 4 12.0002V9.65018L5.75 8.90018Z"
  />
</template>
