<template>
  <path
    d="M13 5.00018L13.75 3.50018H17V2.00018H7V3.50018H11.75L11 5.00018C7.87 5.09018 5 5.73018 5 8.50018V17.0002C5 18.5002 6.11 19.7302 7.55 19.9502L6.36 21.1402C6.04 21.4602 6.26 22.0002 6.71 22.0002H7.8C7.93 22.0002 8.06 21.9502 8.15 21.8502L10 20.0002H14L15.85 21.8502C15.94 21.9402 16.07 22.0002 16.2 22.0002H17.29C17.74 22.0002 17.96 21.4602 17.64 21.1502L16.45 19.9602C17.89 19.7302 19 18.5002 19 17.0002V8.50018C19 5.73018 16.13 5.09018 13 5.00018ZM12 18.5002C11.17 18.5002 10.5 17.8302 10.5 17.0002C10.5 16.1702 11.17 15.5002 12 15.5002C12.83 15.5002 13.5 16.1702 13.5 17.0002C13.5 17.8302 12.83 18.5002 12 18.5002ZM17 14.0002H7V9.00018H17V14.0002Z"
  />
</template>
