<template>
  <path
    d="M20.3 17.6002L3.83 18.4602C3.42 18.4802 3.06 18.1602 3.04 17.7502C3.02 17.3402 3.34 16.9802 3.75 16.9602L20.23 16.1002C20.64 16.0802 21 16.4002 21.02 16.8102C21.04 17.2202 20.72 17.5802 20.3 17.6002ZM20.25 19.4802H3.75C3.34 19.4802 3 19.8202 3 20.2302C3 20.6402 3.34 20.9802 3.75 20.9802H20.25C20.66 20.9802 21 20.6402 21 20.2302C21 19.8202 20.66 19.4802 20.25 19.4802ZM22 5.00018V12.0002C22 13.1002 21.1 14.0002 20 14.0002H4C2.9 14.0002 2 13.1002 2 12.0002V5.00018C2 3.90018 2.9 3.00018 4 3.00018H20C21.1 3.00018 22 3.90018 22 5.00018ZM19.12 6.09018C17.87 6.36018 16.93 7.20018 16.79 8.23018C16.15 7.50018 14.06 5.50018 10.25 5.50018C6.81 5.50018 4.77 7.13018 3.94 7.99018C3.66 8.28018 3.66 8.73018 3.94 9.02018C4.77 9.88018 6.81 11.5102 10.25 11.5102C14.06 11.5102 16.15 9.51018 16.79 8.78018C16.93 9.80018 17.87 10.6402 19.12 10.9202C19.58 11.0202 20 10.6402 20 10.1802V6.84018C20 6.37018 19.57 5.99018 19.12 6.09018Z"
  />
</template>
