<template>
  <path
    d="M12 2.00018C6.48 2.00018 2 6.48018 2 12.0002C2 17.5202 6.48 22.0002 12 22.0002C17.52 22.0002 22 17.5202 22 12.0002C22 6.48018 17.52 2.00018 12 2.00018ZM13.5 6.00018C14.05 6.00018 14.5 6.45018 14.5 7.00018C14.5 7.55018 14.05 8.00018 13.5 8.00018C12.95 8.00018 12.5 7.55018 12.5 7.00018C12.5 6.45018 12.95 6.00018 13.5 6.00018ZM15.41 11.9102C14.7 11.7102 13.78 11.1702 13.09 10.2502L12.68 12.6002L13.87 13.9002C13.95 13.9802 14 14.1002 14 14.2202V17.5002C14 17.7802 13.78 18.0002 13.5 18.0002C13.22 18.0002 13 17.7802 13 17.5002V14.4202L11.89 13.2102L11.46 15.3602C11.41 15.6302 11.14 15.8102 10.87 15.7502L8.09 15.1802C7.82 15.1202 7.64 14.8602 7.7 14.5902C7.76 14.3202 8.02 14.1502 8.29 14.2002L10.58 14.6702L11.54 9.78018L10 10.3502V11.5002C10 11.7802 9.78 12.0002 9.5 12.0002C9.22 12.0002 9 11.7802 9 11.5002V10.0002C9 9.79018 9.13 9.60018 9.33 9.53018L12.28 8.44018C12.77 8.26018 13.3 8.48018 13.53 8.95018C14.18 10.3002 15.08 10.8002 15.63 10.9502C15.85 11.0002 16 11.1802 16 11.4002V11.4402C16 11.7502 15.71 11.9902 15.41 11.9102Z"
  />
</template>
