<template>
  <path
    d="M8.1 13.3402L10.93 10.5102L4.74 4.33018C4.26 3.85018 3.43 3.98018 3.13 4.60018C2.42 6.09018 2.68 7.92018 3.91 9.16018L8.1 13.3402ZM14.88 11.5302C16.41 12.2402 18.56 11.7402 20.15 10.1502C22.06 8.24018 22.43 5.50018 20.96 4.03018C19.5 2.57018 16.76 2.93018 14.84 4.84018C13.25 6.43018 12.75 8.58018 13.46 10.1102L4.4 19.1702C4.01 19.5602 4.01 20.1902 4.4 20.5802C4.79 20.9702 5.42 20.9702 5.81 20.5802L12 14.4102L18.18 20.5902C18.57 20.9802 19.2 20.9802 19.59 20.5902C19.98 20.2002 19.98 19.5702 19.59 19.1802L13.41 13.0002L14.88 11.5302Z"
  />
</template>
