<template>
  <path
    d="M21 14.0002C21 13.4502 20.55 13.0002 20 13.0002H17.93C17.88 12.6102 17.81 12.2302 17.71 11.8602L19.43 10.8702C19.91 10.5902 20.07 9.98019 19.8 9.50019C19.52 9.02019 18.91 8.86019 18.43 9.13019L16.92 10.0002C16.64 9.52019 16.3 9.09019 15.93 8.71019C15.97 8.48019 16 8.25019 16 8.00019C16 7.20019 15.76 6.45019 15.35 5.82019L16.29 4.88019C16.68 4.49019 16.68 3.86019 16.29 3.47019C15.9 3.08019 15.27 3.08019 14.88 3.47019L13.86 4.49019C12.18 3.60019 10.76 4.16019 10.13 4.49019L9.12 3.46019C8.73 3.07019 8.1 3.07019 7.71 3.46019C7.32 3.85019 7.32 4.48019 7.71 4.87019L8.65 5.81019C8.24 6.45019 8 7.20019 8 8.00019C8 8.25019 8.03 8.48019 8.07 8.72019C7.7 9.10019 7.36 9.53019 7.08 10.0002L5.57 9.13019C5.09 8.86019 4.48 9.02019 4.21 9.50019C3.93 9.98019 4.1 10.5902 4.58 10.8702L6.3 11.8602C6.2 12.2302 6.13 12.6102 6.08 13.0002H4C3.45 13.0002 3 13.4502 3 14.0002C3 14.5502 3.45 15.0002 4 15.0002H6.07C6.12 15.3902 6.19 15.7702 6.29 16.1402L4.57 17.1302C4.09 17.4102 3.93 18.0202 4.2 18.5002C4.48 18.9802 5.09 19.1402 5.57 18.8702L7.08 18.0002C8.16 19.8102 9.96 21.0002 12 21.0002C14.04 21.0002 15.84 19.8102 16.92 18.0002L18.43 18.8702C18.91 19.1502 19.52 18.9802 19.8 18.5002C20.08 18.0202 19.91 17.4102 19.43 17.1302L17.71 16.1402C17.81 15.7702 17.88 15.3902 17.93 15.0002H20C20.55 15.0002 21 14.5502 21 14.0002ZM12 17.0002C11.45 17.0002 11 16.5502 11 16.0002V12.0002C11 11.4502 11.45 11.0002 12 11.0002C12.55 11.0002 13 11.4502 13 12.0002V16.0002C13 16.5502 12.55 17.0002 12 17.0002Z"
  />
</template>
