<template>
  <path
    d="M18.18 10.0002L16.48 5.32018C16.19 4.53018 15.44 4.00018 14.6 4.00018H13C12.45 4.00018 12 4.45018 12 5.00018C12 5.55018 12.45 6.00018 13 6.00018H14.6L16.06 10.0002H11.25L10.89 9.00018H10.98C11.53 9.00018 11.98 8.55018 11.98 8.00018C11.98 7.45018 11.53 7.00018 10.98 7.00018H8C7.45 7.00018 7 7.45018 7 8.00018C7 8.55018 7.45 9.00018 8 9.00018H8.75L10.57 14.0002H9.9C9.46 11.7702 7.59 10.1202 5.25 10.0102C2.45 9.87018 0 12.2002 0 15.0002C0 17.8002 2.2 20.0002 5 20.0002C7.46 20.0002 9.45 18.3102 9.9 16.0002H14.1C14.54 18.2302 16.41 19.8802 18.75 19.9902C21.55 20.1202 24 17.8002 24 14.9902C24 12.1902 21.8 9.99018 19 9.99018H18.18V10.0002ZM7.82 16.0002C7.4 17.2302 6.22 18.0802 4.8 17.9902C3.31 17.9002 2.07 16.6402 2 15.1402C1.93 13.3902 3.27 12.0002 5 12.0002C6.33 12.0002 7.42 12.8302 7.82 14.0002H6C5.45 14.0002 5 14.4502 5 15.0002C5 15.5502 5.45 16.0002 6 16.0002H7.82ZM14.1 14.0002H12.7L11.97 12.0002H15C14.56 12.5802 14.24 13.2502 14.1 14.0002ZM18.88 18.0002C17.34 17.9402 16.04 16.6302 16 15.0802C15.98 14.1202 16.39 13.2802 17.05 12.7202L17.67 14.4202C17.86 14.9402 18.43 15.2102 18.95 15.0202C19.47 14.8302 19.74 14.2602 19.55 13.7402L18.92 12.0102C18.92 12.0102 18.92 12.0102 18.93 12.0002C20.65 11.9602 22.01 13.2902 22.01 15.0002C22 16.7202 20.62 18.0602 18.88 18.0002Z"
  />
</template>
