<template>
  <g>
    <path
      d="M17.5 4.50018C15.55 4.50018 13.45 4.90018 12 6.00018C10.55 4.90018 8.45 4.50018 6.5 4.50018C5.05 4.50018 3.51 4.72018 2.22 5.29018C1.49 5.62018 1 6.33018 1 7.14018V18.4202C1 19.7202 2.22 20.6802 3.48 20.3602C4.46 20.1102 5.5 20.0002 6.5 20.0002C8.06 20.0002 9.72 20.2602 11.06 20.9202C11.66 21.2202 12.34 21.2202 12.93 20.9202C14.27 20.2502 15.93 20.0002 17.49 20.0002C18.49 20.0002 19.53 20.1102 20.51 20.3602C21.77 20.6902 22.99 19.7302 22.99 18.4202V7.14018C22.99 6.33018 22.5 5.62018 21.77 5.29018C20.49 4.72018 18.95 4.50018 17.5 4.50018ZM21 17.2302C21 17.8602 20.42 18.3202 19.8 18.2102C19.05 18.0702 18.27 18.0102 17.5 18.0102C15.8 18.0102 13.35 18.6602 12 19.5102V8.00018C13.35 7.15018 15.8 6.50018 17.5 6.50018C18.42 6.50018 19.33 6.59018 20.2 6.78018C20.66 6.88018 21 7.29018 21 7.76018V17.2302Z"
    />
    <path
      d="M13.98 11.0102C13.66 11.0102 13.37 10.8102 13.27 10.4902C13.14 10.1002 13.36 9.67019 13.75 9.55019C15.29 9.05019 17.28 8.89019 19.11 9.10019C19.52 9.15019 19.82 9.52019 19.77 9.93019C19.72 10.3402 19.35 10.6402 18.94 10.5902C17.32 10.4002 15.55 10.5502 14.21 10.9802C14.13 10.9902 14.05 11.0102 13.98 11.0102Z"
    />
    <path
      d="M13.98 13.6702C13.66 13.6702 13.37 13.4702 13.27 13.1502C13.14 12.7602 13.36 12.3302 13.75 12.2102C15.28 11.7102 17.28 11.5502 19.11 11.7602C19.52 11.8102 19.82 12.1802 19.77 12.5902C19.72 13.0002 19.35 13.3002 18.94 13.2502C17.32 13.0602 15.55 13.2102 14.21 13.6402C14.13 13.6602 14.05 13.6702 13.98 13.6702Z"
    />
    <path
      d="M13.98 16.3302C13.66 16.3302 13.37 16.1302 13.27 15.8102C13.14 15.4202 13.36 14.9902 13.75 14.8702C15.28 14.3702 17.28 14.2102 19.11 14.4202C19.52 14.4702 19.82 14.8402 19.77 15.2502C19.72 15.6602 19.35 15.9502 18.94 15.9102C17.32 15.7202 15.55 15.8702 14.21 16.3002C14.13 16.3202 14.05 16.3302 13.98 16.3302Z"
    />
  </g>
</template>
