<template>
  <path
    d="M14.5 12.5902L15.13 15.3202C15.23 15.7502 14.76 16.0902 14.38 15.8602L12 14.4202L9.61 15.8602C9.23 16.0902 8.76 15.7502 8.86 15.3202L9.5 12.6002L7.4 10.7902C7.06 10.5002 7.24 9.95018 7.68 9.91018L10.46 9.67018L11.54 7.11018C11.71 6.70018 12.29 6.70018 12.46 7.11018L13.54 9.66018L16.32 9.90018C16.76 9.94018 16.94 10.4902 16.6 10.7802L14.5 12.5902ZM4.19 4.47018C3.47 4.79018 3 5.51018 3 6.30018V11.0002C3 16.5502 6.84 21.7402 12 23.0002C17.16 21.7402 21 16.5502 21 11.0002V6.30018C21 5.51018 20.53 4.79018 19.81 4.47018L12.81 1.36018C12.29 1.13018 11.7 1.13018 11.19 1.36018L4.19 4.47018Z"
  />
</template>
