<template>
  <path
    d="M12 22.0002C16.56 22.0002 20.33 18.6002 20.92 14.2002C21.01 13.5602 20.44 12.9902 19.8 13.0802C15.4 13.6702 12 17.4402 12 22.0002ZM5.59996 10.2502C5.59996 11.6302 6.71996 12.7502 8.09996 12.7502C8.62996 12.7502 9.10996 12.5902 9.51996 12.3102L9.49996 12.5002C9.49996 13.8802 10.62 15.0002 12 15.0002C13.38 15.0002 14.5 13.8802 14.5 12.5002L14.48 12.3102C14.88 12.5902 15.37 12.7502 15.9 12.7502C17.28 12.7502 18.4 11.6302 18.4 10.2502C18.4 9.25018 17.81 8.40018 16.97 8.00018C17.81 7.60018 18.4 6.75018 18.4 5.75018C18.4 4.37018 17.28 3.25018 15.9 3.25018C15.37 3.25018 14.89 3.41018 14.48 3.69018L14.5 3.50018C14.5 2.12018 13.38 1.00018 12 1.00018C10.62 1.00018 9.49996 2.12018 9.49996 3.50018L9.51996 3.69018C9.11996 3.41018 8.62996 3.25018 8.09996 3.25018C6.71996 3.25018 5.59996 4.37018 5.59996 5.75018C5.59996 6.75018 6.18996 7.60018 7.02996 8.00018C6.18996 8.40018 5.59996 9.25018 5.59996 10.2502ZM12 5.50018C13.38 5.50018 14.5 6.62018 14.5 8.00018C14.5 9.38018 13.38 10.5002 12 10.5002C10.62 10.5002 9.49996 9.38018 9.49996 8.00018C9.49996 6.62018 10.62 5.50018 12 5.50018ZM3.07996 14.2002C3.66996 18.6002 7.43996 22.0002 12 22.0002C12 17.4402 8.59996 13.6702 4.19996 13.0802C3.55996 12.9902 2.98996 13.5602 3.07996 14.2002Z"
  />
</template>
