<template>
  <path
    d="M8.1 13.3402L10.93 10.5102L4.74 4.33017C4.26 3.85017 3.43 3.98017 3.13 4.60017C2.42 6.09017 2.68 7.92017 3.91 9.16017L8.1 13.3402ZM14.88 11.5302C16.41 12.2402 18.56 11.7402 20.15 10.1502C22.06 8.24017 22.43 5.50017 20.96 4.03017C19.5 2.57017 16.76 2.93017 14.84 4.84017C13.25 6.43017 12.75 8.58017 13.46 10.1102L4.41 19.1602C4.02 19.5502 4.02 20.1802 4.41 20.5702C4.8 20.9602 5.43 20.9602 5.82 20.5702L12 14.4102L18.18 20.5902C18.57 20.9802 19.2 20.9802 19.59 20.5902C19.98 20.2002 19.98 19.5702 19.59 19.1802L13.41 13.0002L14.88 11.5302Z"
  />
</template>
