<template>
  <path
    d="M17 5.00017C17.83 5.00017 18.5 4.33017 18.5 3.50017C18.5 2.84017 17.84 1.86017 17.39 1.28017C17.19 1.02017 16.8 1.02017 16.6 1.28017C16.16 1.86017 15.5 2.84017 15.5 3.50017C15.5 4.33017 16.17 5.00017 17 5.00017ZM12 5.00017C12.83 5.00017 13.5 4.33017 13.5 3.50017C13.5 2.84017 12.84 1.86017 12.39 1.28017C12.19 1.02017 11.8 1.02017 11.6 1.28017C11.16 1.86017 10.5 2.84017 10.5 3.50017C10.5 4.33017 11.17 5.00017 12 5.00017ZM7 5.00017C7.83 5.00017 8.5 4.33017 8.5 3.50017C8.5 2.84017 7.84 1.86017 7.39 1.28017C7.19 1.02017 6.8 1.02017 6.6 1.28017C6.16 1.86017 5.5 2.84017 5.5 3.50017C5.5 4.33017 6.17 5.00017 7 5.00017ZM18.92 8.01017C18.72 7.42017 18.16 7.00017 17.5 7.00017H6.5C5.84 7.00017 5.29 7.42017 5.08 8.01017L3.11 13.6802C3.04 13.8902 3 14.1102 3 14.3402V21.5002C3 22.3302 3.67 23.0002 4.5 23.0002C5.33 23.0002 6 22.3302 6 21.5002V21.0002H18V21.5002C18 22.3202 18.67 23.0002 19.5 23.0002C20.32 23.0002 21 22.3302 21 21.5002V14.3402C21 14.1202 20.96 13.8902 20.89 13.6802L18.92 8.01017ZM6.5 18.0002C5.67 18.0002 5 17.3302 5 16.5002C5 15.6702 5.67 15.0002 6.5 15.0002C7.33 15.0002 8 15.6702 8 16.5002C8 17.3302 7.33 18.0002 6.5 18.0002ZM17.5 18.0002C16.67 18.0002 16 17.3302 16 16.5002C16 15.6702 16.67 15.0002 17.5 15.0002C18.33 15.0002 19 15.6702 19 16.5002C19 17.3302 18.33 18.0002 17.5 18.0002ZM5 13.0002L6.27 9.18017C6.41 8.78017 6.79 8.50017 7.22 8.50017H16.78C17.21 8.50017 17.59 8.78017 17.73 9.18017L19 13.0002H5Z"
  />
</template>
