<template>
  <path
    d="M20 12.0002C20 11.2402 20.43 10.5802 21.06 10.2402C21.66 9.91018 22 9.23018 22 8.54018V6.00018C22 4.90018 21.1 4.00018 20 4.00018H4C2.9 4.00018 2.01 4.89018 2.01 5.99018V8.54018C2.01 9.23018 2.34 9.91018 2.95 10.2302C3.58 10.5802 4 11.2402 4 12.0002C4 12.7602 3.57 13.4302 2.94 13.7602C2.34 14.0902 2 14.7702 2 15.4602V18.0002C2 19.1002 2.9 20.0002 4 20.0002H20C21.1 20.0002 22 19.1002 22 18.0002V15.4602C22 14.7702 21.66 14.0902 21.06 13.7602C20.43 13.4202 20 12.7602 20 12.0002ZM14.5 16.1002L12 14.5002L9.5 16.1102C9.12 16.3502 8.63 16.0002 8.75 15.5602L9.5 12.6802L7.2 10.8002C6.85 10.5102 7.03 9.94018 7.49 9.91018L10.45 9.74018L11.53 6.99018C11.7 6.57018 12.3 6.57018 12.46 6.99018L13.54 9.75018L16.5 9.92018C16.95 9.95018 17.14 10.5202 16.79 10.8102L14.49 12.6902L15.25 15.5502C15.37 16.0002 14.88 16.3502 14.5 16.1002Z"
  />
</template>
