<template>
  <path
    d="M21 14.5802C21 14.2202 20.81 13.8902 20.51 13.6902L13 9.00018V3.50018C13 2.67018 12.33 2.00018 11.5 2.00018C10.67 2.00018 10 2.67018 10 3.50018V9.00018L2.49 13.6902C2.19 13.8802 2 14.2202 2 14.5802C2 15.2802 2.68 15.7902 3.36 15.5802L10 13.5002V19.0002L8.2 20.3502C8.07 20.4402 8 20.5902 8 20.7502V21.3402C8 21.6702 8.32 21.9102 8.64 21.8202L11.5 21.0002L14.36 21.8202C14.68 21.9102 15 21.6702 15 21.3402V20.7502C15 20.5902 14.93 20.4402 14.8 20.3502L13 19.0002V13.5002L19.64 15.5802C20.32 15.7902 21 15.2802 21 14.5802Z"
  />
</template>
