<template>
  <path
    d="M19.77 7.23018L19.78 7.22018L16.59 4.03018C16.3 3.74018 15.82 3.74018 15.53 4.03018C15.24 4.32018 15.24 4.80018 15.53 5.09018L17.11 6.67018C16.06 7.07018 15.35 8.14018 15.53 9.38018C15.69 10.4802 16.63 11.3702 17.73 11.4902C18.2 11.5402 18.61 11.4602 19 11.2902V18.5002C19 19.0502 18.55 19.5002 18 19.5002C17.45 19.5002 17 19.0502 17 18.5002V14.0002C17 12.9002 16.1 12.0002 15 12.0002H14V5.00018C14 3.90018 13.1 3.00018 12 3.00018H6C4.9 3.00018 4 3.90018 4 5.00018V20.0002C4 20.5502 4.45 21.0002 5 21.0002H13C13.55 21.0002 14 20.5502 14 20.0002V13.5002H15.5V18.3602C15.5 19.6702 16.44 20.8602 17.74 20.9902C19.24 21.1402 20.5 19.9702 20.5 18.5002V9.00018C20.5 8.31018 20.22 7.68018 19.77 7.23018ZM18 10.0002C17.45 10.0002 17 9.55018 17 9.00018C17 8.45018 17.45 8.00018 18 8.00018C18.55 8.00018 19 8.45018 19 9.00018C19 9.55018 18.55 10.0002 18 10.0002ZM8 16.1202V13.5002H6.83C6.45 13.5002 6.21 13.1002 6.39 12.7602L9.06 7.76018C9.3 7.31018 10 7.48018 10 8.00018V11.0002H11.14C11.52 11.0002 11.76 11.4102 11.57 11.7502L8.93 16.3702C8.68 16.8102 8 16.6302 8 16.1202Z"
  />
</template>
