<template>
  <g>
    <path
      d="M19 7.00018H18.18L16.48 2.32018C16.19 1.53018 15.44 1.00018 14.6 1.00018H13C12.45 1.00018 12 1.45018 12 2.00018C12 2.55018 12.45 3.00018 13 3.00018H14.6L16.06 7.00018H11.25L10.89 6.00018H10.98C11.53 6.00018 11.98 5.55018 11.98 5.00018C11.98 4.45018 11.53 4.00018 10.98 4.00018H8C7.45 4.00018 7 4.45018 7 5.00018C7 5.55018 7.45 6.00018 8 6.00018H8.75L10.57 11.0002H9.9C9.46 8.77018 7.59 7.12018 5.25 7.01018C2.45 6.87018 0 9.20018 0 12.0002C0 14.8002 2.2 17.0002 5 17.0002C7.46 17.0002 9.45 15.3102 9.9 13.0002H14.1C14.54 15.2302 16.41 16.8802 18.75 16.9902C21.55 17.1202 24 14.8002 24 11.9902C24 9.20018 21.8 7.00018 19 7.00018ZM6 13.0002H7.82C7.4 14.2302 6.22 15.0802 4.8 14.9902C3.31 14.9002 2.07 13.6402 2 12.1402C1.93 10.3902 3.27 9.00018 5 9.00018C6.33 9.00018 7.42 9.83018 7.82 11.0002H6C5.45 11.0002 5 11.4502 5 12.0002C5 12.5502 5.45 13.0002 6 13.0002ZM14.1 11.0002H12.7L11.97 9.00018H15C14.56 9.58018 14.24 10.2502 14.1 11.0002ZM18.88 15.0002C17.34 14.9402 16.04 13.6302 16 12.0802C15.98 11.1202 16.39 10.2802 17.05 9.72018L17.67 11.4202C17.86 11.9402 18.43 12.2102 18.95 12.0202C19.47 11.8302 19.74 11.2602 19.55 10.7402L18.92 9.01018C18.92 9.01018 18.92 9.01018 18.93 9.00018C20.64 8.96018 22 10.2902 22 12.0002C22 13.7202 20.62 15.0602 18.88 15.0002Z"
    />
    <path d="M11 20.0002H7L13 23.0002V21.0002H17L11 18.0002V20.0002Z" />
  </g>
</template>
