<template>
  <g>
    <path
      d="M16.24 11.5102L17.81 9.94017L14.06 6.19017L12.49 7.76017L8.35 3.63017C7.57 2.85017 6.3 2.85017 5.52 3.63017L3.62 5.53017C2.84 6.31017 2.84 7.58017 3.62 8.36017L7.75 12.4902L3.15 17.1002C3.05 17.2002 3 17.3202 3 17.4602V20.5002C3 20.7802 3.22 21.0002 3.5 21.0002H6.54C6.67 21.0002 6.8 20.9502 6.89 20.8502L11.51 16.2302L15.64 20.3602C16.96 21.6802 18.4 20.4302 18.47 20.3602L20.37 18.4602C21.15 17.6802 21.15 16.4102 20.37 15.6302L16.24 11.5102ZM9.18 11.0702L5.04 6.94017L6.93 5.04017L8.2 6.31017L7.73 6.80017C7.34 7.19017 7.34 7.82017 7.73 8.21017C8.12 8.60017 8.75 8.60017 9.14 8.21017L9.62 7.73017L11.07 9.18017L9.18 11.0702ZM17.06 18.9602L12.93 14.8302L14.83 12.9302L16.28 14.3802L15.8 14.8602C15.41 15.2502 15.41 15.8802 15.8 16.2702C16.19 16.6602 16.82 16.6602 17.21 16.2702L17.69 15.7902L18.96 17.0602L17.06 18.9602Z"
    />
    <path
      d="M20.71 7.04017C21.1 6.65017 21.1 6.02017 20.71 5.63017L18.37 3.29017C17.9 2.82017 17.25 3.00017 16.96 3.29017L15.13 5.12017L18.88 8.87017L20.71 7.04017Z"
    />
  </g>
</template>
