<template>
  <path
    d="M8 9.75018C8 10.1602 8.34 10.5002 8.75 10.5002H10.25V14.2502C10.25 14.6602 10.59 15.0002 11 15.0002C11.41 15.0002 11.75 14.6602 11.75 14.2502V10.5002H13.25C13.66 10.5002 14 10.1602 14 9.75018C14 9.34018 13.66 9.00018 13.25 9.00018H8.75C8.34 9.00018 8 9.34018 8 9.75018ZM6 9.00018H3C2.45 9.00018 2 9.45018 2 10.0002V14.2502C2 14.6602 2.34 15.0002 2.75 15.0002C3.16 15.0002 3.5 14.6602 3.5 14.2502V13.5002H5.5V14.2502C5.5 14.6602 5.84 15.0002 6.25 15.0002C6.66 15.0002 7 14.6602 7 14.2502V10.0002C7 9.45018 6.55 9.00018 6 9.00018ZM5.5 12.0002H3.5V10.5002H5.5V12.0002ZM21 9.00018H16.5C15.95 9.00018 15.5 9.45018 15.5 10.0002V14.2502C15.5 14.6602 15.84 15.0002 16.25 15.0002C16.66 15.0002 17 14.6602 17 14.2502V10.5002H18V13.2502C18 13.6602 18.34 14.0002 18.75 14.0002C19.16 14.0002 19.5 13.6602 19.5 13.2502V10.4902H20.5V14.2502C20.5 14.6602 20.84 15.0002 21.25 15.0002C21.66 15.0002 22 14.6602 22 14.2502V10.0002C22 9.45018 21.55 9.00018 21 9.00018Z"
  />
</template>
