<template>
  <path
    d="M6 15.0002H18C18.55 15.0002 19 14.5502 19 14.0002V10.0502C19 9.50024 18.55 9.05024 18 9.05024H6C5.45 9.05024 5 9.50024 5 10.0502V14.0002C5 14.5502 5.45 15.0002 6 15.0002ZM11 2.00024V3.05024C11 3.60024 11.45 4.00024 12 4.00024C12.55 4.00024 13 3.60024 13 3.05024V2.00024C13 1.45024 12.55 1.00024 12 1.00024C11.45 1.00024 11 1.45024 11 2.00024ZM18.34 4.30024L17.96 4.68024C17.57 5.07024 17.57 5.70024 17.96 6.09024C18.35 6.48024 18.98 6.48024 19.37 6.09024L19.75 5.71024C20.14 5.32024 20.14 4.69024 19.75 4.30024C19.36 3.91024 18.73 3.91024 18.34 4.30024ZM13 22.0002V21.0402C13 20.4902 12.55 20.0402 12 20.0402C11.45 20.0402 11 20.4902 11 21.0402V22.0002C11 22.5502 11.45 23.0002 12 23.0002C12.55 23.0002 13 22.5502 13 22.0002ZM19.74 18.3902L19.35 18.0002C18.96 17.6102 18.33 17.6102 17.94 18.0002C17.55 18.3902 17.55 19.0202 17.94 19.4102L18.32 19.8002C18.71 20.1902 19.34 20.1902 19.73 19.8002L19.74 19.7902C20.13 19.4102 20.13 18.7702 19.74 18.3902ZM4.25 5.71024L4.64 6.10024C5.03 6.49024 5.66 6.49024 6.05 6.10024C6.44 5.71024 6.44 5.08024 6.05 4.69024L5.66 4.30024C5.27 3.91024 4.64 3.91024 4.25 4.30024C3.87 4.69024 3.87 5.33024 4.25 5.71024ZM5.67 19.7902L6.05 19.4102C6.44 19.0202 6.44 18.3902 6.05 18.0002C5.66 17.6102 5.03 17.6102 4.64 18.0002L4.26 18.3802C3.87 18.7702 3.87 19.4002 4.26 19.7902C4.64 20.1802 5.28 20.1802 5.67 19.7902Z"
  />
</template>
