<template>
  <path
    d="M4.25 19.7903C4.64 20.1803 5.27 20.1803 5.66 19.7903L6.05 19.4003C6.44 19.0103 6.43 18.3803 6.05 18.0003L6.04 17.9903C5.65 17.6003 5.02 17.6003 4.63 17.9903L4.24 18.3803C3.86 18.7803 3.86 19.4003 4.25 19.7903ZM11.99 23.0003H12C12.55 23.0003 12.99 22.5603 12.99 22.0103V21.0503C12.99 20.5003 12.55 20.0603 12 20.0603H11.99C11.44 20.0603 11 20.5003 11 21.0503V22.0103C11 22.5603 11.44 23.0003 11.99 23.0003ZM3.01 11.0503H1.99C1.44 11.0503 1 11.4903 1 12.0403V12.0503C1 12.6003 1.44 13.0403 1.99 13.0403H3C3.55 13.0403 3.99 12.6003 3.99 12.0503V12.0403C4 11.4903 3.56 11.0503 3.01 11.0503ZM15 6.86029V3.05029C15 2.50029 14.55 2.05029 14 2.05029H10C9.45 2.05029 9 2.50029 9 3.05029V6.86029C6.96 8.04029 5.68 10.3803 6.07 12.9903C6.47 15.6003 8.63 17.6903 11.25 18.0103C14.89 18.4503 18 15.6103 18 12.0603C18 9.83029 16.79 7.90029 15 6.86029ZM20 12.0403V12.0503C20 12.6003 20.44 13.0403 20.99 13.0403H22C22.55 13.0403 22.99 12.6003 22.99 12.0503V12.0403C22.99 11.4903 22.55 11.0503 22 11.0503H20.99C20.44 11.0503 20 11.4903 20 12.0403ZM17.94 19.4103L18.33 19.8003C18.72 20.1903 19.35 20.1903 19.74 19.8003C20.13 19.4103 20.13 18.7803 19.74 18.3903L19.35 18.0003C18.96 17.6103 18.33 17.6203 17.95 18.0003C17.55 18.4003 17.55 19.0203 17.94 19.4103Z"
  />
</template>
