<template>
  <path
    d="M6.85 12.6502H9.15L8 9.00024L6.85 12.6502ZM22.72 7.00024C22.3 7.00024 21.95 7.30024 21.87 7.70024L20.8 13.2902L19.49 7.78024C19.38 7.32024 18.97 7.00024 18.5 7.00024C18.03 7.00024 17.62 7.32024 17.52 7.78024L16.21 13.2902L15.14 7.70024C15.06 7.30024 14.7 7.00024 14.29 7.00024C14.28 7.00024 14.26 7.01024 14.25 7.01024C12.78 5.18024 10.53 4.00024 8 4.00024C3.58 4.00024 0 7.58024 0 12.0002C0 16.4202 3.58 20.0002 8 20.0002C11.17 20.0002 13.9 18.1502 15.2 15.4802C15.4 15.8002 15.75 16.0002 16.14 16.0002C16.65 16.0002 17.09 15.6502 17.21 15.1602L18.5 9.90024L19.79 15.1602C19.91 15.6502 20.36 16.0002 20.86 16.0002C21.38 16.0002 21.82 15.6402 21.94 15.1402L23.55 8.06024C23.68 7.52024 23.27 7.00024 22.72 7.00024ZM10.93 16.0002C10.55 16.0002 10.21 15.7602 10.09 15.4002L9.6 14.0002H6.4L5.91 15.4002C5.78 15.7602 5.45 16.0002 5.07 16.0002C4.45 16.0002 4.02 15.3902 4.23 14.8102L6.67 7.95024C6.87 7.38024 7.4 7.00024 8 7.00024C8.6 7.00024 9.13 7.38024 9.34 7.94024L11.78 14.8002C11.98 15.3902 11.55 16.0002 10.93 16.0002Z"
  />
</template>
