<template>
  <path
    d="M12 2.00024C6.48 2.00024 2 6.48024 2 12.0002C2 17.5202 6.48 22.0002 12 22.0002C17.52 22.0002 22 17.5202 22 12.0002C22 6.48024 17.52 2.00024 12 2.00024ZM11 19.9302C7.06 19.4402 4 16.0802 4 12.0002C4 7.92024 7.05 4.56024 11 4.07024V19.9302ZM13 4.07024C14.03 4.20024 15 4.52024 15.87 5.00024H13V4.07024ZM13 7.00024H18.24C18.49 7.31024 18.72 7.65024 18.92 8.00024H13V7.00024ZM13 10.0002H19.74C19.82 10.3302 19.89 10.6602 19.93 11.0002H13V10.0002ZM13 19.9302V19.0002H15.87C15 19.4802 14.03 19.8002 13 19.9302ZM18.24 17.0002H13V16.0002H18.92C18.72 16.3502 18.49 16.6902 18.24 17.0002ZM19.74 14.0002H13V13.0002H19.93C19.89 13.3402 19.82 13.6702 19.74 14.0002Z"
  />
</template>
