<template>
  <path
    d="M10 3.00024H14C14.55 3.00024 15 2.55024 15 2.00024C15 1.45024 14.55 1.00024 14 1.00024H10C9.45001 1.00024 9.00001 1.45024 9.00001 2.00024C9.00001 2.55024 9.45001 3.00024 10 3.00024ZM12 8.00024C11.49 8.00024 11.08 8.39024 11.02 8.89024L13 10.8602V9.00024C13 8.45024 12.55 8.00024 12 8.00024ZM12 6.00024C15.87 6.00024 19 9.13024 19 13.0002C19 14.1202 18.73 15.1802 18.26 16.1202L19.73 17.5902C20.53 16.2502 21 14.6802 21 13.0002C21 10.8802 20.26 8.93024 19.03 7.39024L19.78 6.64024C20.16 6.26024 20.17 5.63024 19.78 5.24024L19.77 5.23024C19.38 4.84024 18.76 4.85024 18.37 5.23024L17.62 5.98024C16.07 4.74024 14.12 4.00024 12 4.00024C10.34 4.00024 8.78001 4.48024 7.43001 5.29024L8.88001 6.74024C9.82001 6.27024 10.88 6.00024 12 6.00024ZM20.19 20.8802L3.87001 4.56024C3.48001 4.17024 2.85001 4.17024 2.46001 4.56024C2.07001 4.95024 2.07001 5.58024 2.46001 5.97024L4.53001 8.04024C3.61001 9.42024 3.05001 11.0302 3.00001 12.7602C2.87001 17.8402 6.94001 22.0002 12 22.0002C13.84 22.0002 15.55 21.4502 16.98 20.5002L18.77 22.2902C19.16 22.6802 19.79 22.6802 20.18 22.2902C20.58 21.9002 20.58 21.2702 20.19 20.8802ZM12 20.0002C8.13001 20.0002 5.00001 16.8702 5.00001 13.0002C5.00001 11.7102 5.35001 10.5102 5.96001 9.48024L15.53 19.0502C14.49 19.6502 13.29 20.0002 12 20.0002Z"
  />
</template>
