<template>
  <path
    d="M10 3.00024H14C14.55 3.00024 15 2.55024 15 2.00024C15 1.45024 14.55 1.00024 14 1.00024H10C9.45001 1.00024 9.00001 1.45024 9.00001 2.00024C9.00001 2.55024 9.45001 3.00024 10 3.00024ZM19.03 7.39024L19.78 6.64024C20.16 6.26024 20.17 5.63024 19.78 5.24024L19.77 5.23024C19.38 4.84024 18.76 4.85024 18.37 5.23024L17.62 5.98024C16.07 4.74024 14.12 4.00024 12 4.00024C7.20001 4.00024 3.12001 7.96024 3.00001 12.7602C2.87001 17.8402 6.94001 22.0002 12 22.0002C16.98 22.0002 21 17.9702 21 13.0002C21 10.8802 20.26 8.93024 19.03 7.39024ZM12 20.0002C8.13001 20.0002 5.00001 16.8702 5.00001 13.0002C5.00001 9.13024 8.13001 6.00024 12 6.00024C15.87 6.00024 19 9.13024 19 13.0002C19 16.8702 15.87 20.0002 12 20.0002ZM10.81 15.0002H7.11001C6.73001 15.0002 6.49001 15.4002 6.66001 15.7402C7.22001 16.8602 8.10001 17.7502 9.23001 18.3102C9.46001 18.4202 9.75001 18.3302 9.88001 18.1002L11.25 15.7502C11.44 15.4202 11.2 15.0002 10.81 15.0002ZM14.73 7.65024C14.5 7.53024 14.21 7.63024 14.08 7.85024L12.7 10.2402C12.5 10.5802 12.74 11.0002 13.13 11.0002H16.89C17.27 11.0002 17.51 10.6002 17.34 10.2702C16.76 9.14024 15.85 8.23024 14.73 7.65024ZM13.88 14.7002C13.69 14.3602 13.2 14.3502 13.01 14.6902L10.97 18.2102C10.79 18.5302 10.99 18.9302 11.36 18.9602C12.7 19.1002 14.05 18.7802 15.19 18.0702C15.41 17.9302 15.47 17.6402 15.35 17.4102L13.88 14.7002ZM10.31 13.2302L7.93001 9.57024C7.73001 9.27024 7.29001 9.27024 7.09001 9.57024C6.28001 10.7302 5.92001 12.1402 6.04001 13.5502C6.06001 13.8102 6.28001 14.0002 6.54001 14.0002H9.89001C10.28 14.0002 10.52 13.5602 10.31 13.2302ZM13.97 12.7402L15.99 16.4802C16.17 16.8102 16.63 16.8302 16.85 16.5302C17.71 15.3502 18.09 13.9102 17.97 12.4502C17.95 12.1902 17.72 12.0002 17.47 12.0002H14.42C14.03 12.0002 13.79 12.4002 13.97 12.7402ZM10.17 11.1702C10.37 11.4802 10.83 11.4702 11.02 11.1502L12.96 7.80024C13.15 7.48024 12.93 7.08024 12.56 7.04024C11.2 6.92024 9.83001 7.25024 8.68001 8.01024C8.46001 8.16024 8.41001 8.47024 8.55001 8.69024L10.17 11.1702Z"
  />
</template>
