<template>
  <path
    d="M14.83 4.83022L12.7 2.70022C12.08 2.08022 11 2.52022 11 3.41022V4.07022C7.06 4.56022 4 7.92022 4 12.0002C4 15.6402 6.43 18.7102 9.77 19.6802C10.39 19.8602 11 19.3602 11 18.7202V18.6902C11 18.2602 10.73 17.8702 10.32 17.7502C7.82 17.0302 6 14.7302 6 12.0002C6 9.03022 8.16 6.57022 11 6.09022V7.62021C11 8.51021 12.07 8.95021 12.7 8.33021L14.83 6.25022C15.23 5.87022 15.23 5.23022 14.83 4.83022ZM19.67 9.76022C19.51 9.21022 19.29 8.68021 19.01 8.17022C18.7 7.60021 17.91 7.51021 17.45 7.97021L17.44 7.98022C17.13 8.29022 17.06 8.76022 17.27 9.14022C17.47 9.51022 17.63 9.90022 17.75 10.3002C17.87 10.7202 18.26 11.0002 18.69 11.0002H18.71C19.36 11.0002 19.86 10.3802 19.67 9.76022ZM13 18.6802V18.7002C13 19.3502 13.62 19.8402 14.24 19.6602C14.79 19.5002 15.32 19.2802 15.83 19.0002C16.4 18.6902 16.49 17.9002 16.03 17.4402L16.01 17.4202C15.7 17.1102 15.23 17.0402 14.85 17.2502C14.48 17.4602 14.09 17.6202 13.69 17.7402C13.28 17.8602 13 18.2502 13 18.6802ZM17.44 16.0302C17.9 16.4902 18.69 16.4002 19 15.8302C19.28 15.3202 19.5 14.7902 19.67 14.2402C19.85 13.6202 19.36 13.0002 18.71 13.0002H18.69C18.25 13.0002 17.87 13.2802 17.75 13.7002C17.63 14.1002 17.47 14.4902 17.27 14.8702C17.06 15.2502 17.14 15.7302 17.44 16.0302Z"
  />
</template>
