<template>
  <path
    d="M5.93001 7.83027L2.28001 11.4903C1.50001 12.2703 1.50001 13.5403 2.28001 14.3203L5.94001 17.9803C6.72001 18.7603 7.99001 18.7603 8.77001 17.9803L12.43 14.3303C13.21 13.5503 13.21 12.2803 12.43 11.5003L8.76001 7.82027C7.97001 7.04027 6.71001 7.04027 5.93001 7.83027ZM4.40001 12.1903L6.65001 9.94027C7.04001 9.55027 7.67001 9.55027 8.07001 9.94027L10.31 12.1803C10.7 12.5703 10.7 13.2003 10.31 13.5903L8.06001 15.8403C7.67001 16.2303 7.04001 16.2303 6.64001 15.8403L4.40001 13.6103C4.01001 13.2203 4.01001 12.5803 4.40001 12.1903ZM19.36 6.64027C17.61 4.88027 15.3 4.00027 13 4.00027V3.17027C13 2.28027 11.92 1.83027 11.29 2.46027L9.47001 4.29027C9.08001 4.68027 9.08001 5.31027 9.47001 5.70027L11.3 7.53027C11.92 8.16027 13 7.72027 13 6.83027V6.00027C15.02 6.00027 17.03 6.86027 18.45 8.61027C20.5 11.1303 20.5 14.8803 18.45 17.4003C17.03 19.1403 15.02 20.0003 13 20.0003C12.22 20.0003 11.45 19.8703 10.71 19.6103C10.35 19.4903 9.96001 19.6003 9.69001 19.8703C9.19001 20.3703 9.35001 21.2603 10.03 21.4903C10.99 21.8303 11.99 22.0003 13 22.0003C15.3 22.0003 17.61 21.1203 19.36 19.3603C22.88 15.8503 22.88 10.1503 19.36 6.64027Z"
  />
</template>
