<template>
  <path
    d="M19.02 10.9902V18.0002C19.02 18.5502 18.57 19.0002 18.02 19.0002H5.99999C5.44999 19.0002 4.99999 18.5502 4.99999 18.0002V6.00024C4.99999 5.45024 5.44999 5.00024 5.99999 5.00024H13C13.55 5.00024 14 4.55024 14 4.00024C14 3.45024 13.55 3.00024 13 3.00024H5.01999C3.91999 3.00024 3.01999 3.90024 3.01999 5.00024V19.0002C3.01999 20.1002 3.91999 21.0002 5.01999 21.0002H19C20.1 21.0002 21 20.1102 21 19.0002V10.9902C21 10.4402 20.56 10.0002 20.01 10.0002C19.46 10.0002 19.02 10.4402 19.02 10.9902ZM13.25 10.7502L12.46 9.00024C12.28 8.61024 11.73 8.61024 11.55 9.00024L10.76 10.7502L8.99999 11.5402C8.60999 11.7202 8.60999 12.2702 8.99999 12.4502L10.75 13.2402L11.54 15.0002C11.72 15.3902 12.27 15.3902 12.45 15.0002L13.24 13.2502L15 12.4602C15.39 12.2802 15.39 11.7302 15 11.5502L13.25 10.7502ZM17.94 6.06024L17.34 4.74024C17.21 4.45024 16.79 4.45024 16.65 4.74024L16.05 6.06024L14.73 6.66024C14.44 6.79024 14.44 7.21024 14.73 7.35024L16.05 7.95024L16.65 9.27024C16.78 9.56024 17.2 9.56024 17.34 9.27024L17.94 7.95024L19.26 7.35024C19.55 7.22024 19.55 6.80024 19.26 6.66024L17.94 6.06024Z"
  />
</template>
